HKS Drift Chamber 1 Efficiencies

HV (v) U U' X X' V V' 1800 0.928 0.937 0.953 0.936 0.941 0.951 1900 0.994 0.999 0.996 0.996 0.988 0.996 1970 0.993 0.998 0.996 0.994 0.987 0.996